(GeV/c) Tp 2 4 6 8 10 12 14 pPb R

0 0.2 0.4 0.6 0.8 1 1.2 1.4

< 0.43 cmsy

ALICE, -1.37 < < 0 cmsy

CMS, -0.9 < FONLL + EPPS16

95%CL

from B ψJ/